<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">\chapter{Executing \caps{\PROGRAM}} \label{chap:exec}

\input{../include/execsite}

\section{Execution Files} \label{exec:files}

The table below summarizes \caps{\PROGRAM}'s file usage.

\begin{center} \begin{tabular}{||l|c|c|c||}
\hline
\multicolumn{1}{||c}{Description} &amp;
\multicolumn{1}{|c}{Unit Number} &amp;
\multicolumn{1}{|c}{Type} &amp;
\multicolumn{1}{|c||}{File Format} \\
\hline
User input &amp; standard input &amp; input &amp; Section~\ref{chap:command} \\
User output &amp; standard output &amp; output &amp; ASCII \\
ABAQUS database &amp; 8 &amp; input &amp; Appendix~\ref{appx:abaqus} \\
EXODUS database &amp; 11 &amp; output &amp; Appendix~\ref{appx:exodus} \\
Scratch file &amp; 20 &amp; scratch &amp; binary \\
\hline
\end{tabular} \end{center}

All files must be connected to the appropriate unit before
\caps{\PROGRAM} is run. Each file (except standard input and output) is
opened with the name retrieved by the \caps{EXNAME} routine of the
\caps{SUPES} library \cite{bib:supes}.

\section{Special Software}

\caps{\PROGRAM} is written in ANSI \caps{FORTRAN}-77 \cite{bib:f77}
with the exception of the following system-dependent features:
\setlength{\itemsep}{\medskipamount} \begin{itemize}
\item the \caps{OPEN} options for the files.
\end{itemize}

\caps{\PROGRAM} uses the following software packages:
\setlength{\itemsep}{\medskipamount} \begin{itemize}
\item the \caps{ABAQUS} library package which opens and reads the
\caps{ABAQUS} database and
\item the \caps{SUPES} package \cite{bib:supes} which includes dynamic
memory allocation, a free-field reader, and \caps{FORTRAN} extensions.
\end{itemize}
</pre></body></html>