     Material        X             Y
         1      0.00000E+00  -7.19250E+01  Minimum
                5.05000E+01  -2.50000E+01  Maximum
                5.05000E+01   4.69250E+01  Range

        11      4.78750E+01  -2.50000E+01  Minimum
                4.82500E+01   0.00000E+00  Maximum
                3.75000E-01   2.50000E+01  Range

         3      0.00000E+00  -7.15000E+01  Minimum
                4.78750E+01  -3.50000E+01  Maximum
                4.78750E+01   3.65000E+01  Range

         2      0.00000E+00  -5.95500E+01  Minimum
                3.86250E+01  -2.50000E+01  Maximum
                3.86250E+01   3.45500E+01  Range

        22      3.60000E+01  -2.50000E+01  Minimum
                3.62500E+01   0.00000E+00  Maximum
                2.50000E-01   2.50000E+01  Range

         7      0.00000E+00  -5.93000E+01  Minimum
                3.59484E+01  -4.71200E+01  Maximum
                3.59484E+01   1.21800E+01  Range

         8      0.00000E+00  -8.19300E+01  Minimum
                3.00000E+00  -7.19300E+01  Maximum
                3.00000E+00   1.00000E+01  Range

         9      0.00000E+00  -4.71200E+01  Minimum
                3.60000E+01  -4.70000E+01  Maximum
                3.60000E+01   1.19999E-01  Range

        10      0.00000E+00  -4.70000E+01  Minimum
                3.00000E+01  -3.70000E+01  Maximum
                3.00000E+01   1.00000E+01  Range

     Limits for Total Body:
                0.00000E+00  -8.19300E+01  Minimum
                5.05000E+01   0.00000E+00  Maximum
                5.05000E+01   8.19300E+01  Range
