\chapter{Site Supplements} \label{appx:site}

\section{CRAY CTSS}

To execute \caps{\PROGRAM}, the user must have selected the
\cmd{acclib} library and be running \cmd{ccl}.

The command to execute \caps{\PROGRAM} on \caps{CTSS} is:
\begin{center}
\cmd{abaexo \param{EXODUS\_database}
   i=\param{input} o=\param{output}}
\end{center}

The filename of the input \caps{ABAQUS} database must be \cmd{tape8}.

\param{EXODUS\_database} is the filename of the output \caps{EXODUS}
database. The default is \cmd{tape11}.

User input is read from \param{input}, which defaults to \cmd{tty} (the
terminal keyword). User output is directed to \param{output}, which
defaults to \cmd{tty} (the terminal).
